  <!--危险源管理-->
<template>
  <div class="app-container hazard">
    <div class="hazard-min" v-if="pageType==1">
      <el-form :model="queryParams" ref="queryForm" :inline="true" v-show="showSearch" label-width="90px" class="form-box">
        <el-form-item label="危险源名称" prop="name" style="margin-left:20px;">
          <el-input
            v-model="queryParams.name"
            placeholder="请输入危险源名称"
            clearable
            size="small"
          />
        </el-form-item>
        <el-form-item style="float: right;">
          <el-col :span="1.5">
            <p class="add-button-one-90"
               @click="addLaboratoryButton"
               v-hasPermi="['laboratory:hazard:add']"
            ><i class="el-icon-plus"></i>添加</p>
          </el-col>
        </el-form-item>
        <el-form-item>
          <p class="inquire-button-one" @click="handleQuery">查询</p>
          <p class="reset-button-one" @click="resetQuery">重置</p>
        </el-form-item>
      </el-form>
      <!--<div class="for-max-box">-->
        <!--<div class="for-big-box" v-for="(item,index) in hazardList" :key="index">-->
          <!--&lt;!&ndash;<p class="class-name-p color_ff" :class="item.type==1?'lv1Back':(item.type==2?'lv2Back':(item.type==3?'lv3Back':(item.type==4?'lv4Back':'')))">危险化学品</p>&ndash;&gt;-->
          <!--<p class="name-box color_66">{{item.name}}</p>-->
          <!--<div class="progress-box">-->
            <!--<p class="color_99">实验室危险源占比 {{item.labScale}}%</p>-->
            <!--<el-progress :text-inside="true" :stroke-width="20" color="#F7CB6B" :percentage="item.labScale" style="margin-right:74px;"></el-progress>-->
          <!--</div>-->
          <!--<div class="progress-box">-->
            <!--<p class="color_99">发生事故占比 {{item.faultScale}}%</p>-->
            <!--<el-progress :text-inside="true" :stroke-width="20" color="#FF4C76" :percentage="item.faultScale" style="margin-right:74px;"></el-progress>-->
          <!--</div>-->
          <!--<div class="progress-box">-->
            <!--<p class="color_99">关联风险占比 {{item.planScale}}%</p>-->
            <!--<el-progress :text-inside="true" :stroke-width="20" color="#52a1fe" :percentage="item.planScale" style="margin-right:74px;"></el-progress>-->
          <!--</div>-->
          <!--<div class="button-null-left"></div>-->
          <!--<div class="button-box">-->
            <!--<p class="table-button-warning-90" style="margin-right:20px;" @click="addLaboratoryButton(item)"><i class="el-icon-edit-outline"></i>编辑</p>-->
            <!--<p class="table-button-grey-90" @click="handleDelete(item)"><i class="el-icon-delete"></i>删除</p>-->
          <!--</div>-->
        <!--</div>-->
        <!--<img v-if="!hazardList[0]" src="@/assets/ZDimages/null-data-1.png" style="display: block;width:200px;margin:100px auto;">-->
      <!--</div>-->

      <el-table v-loading="loading" border :data="hazardList" @selection-change="handleSelectionChange">
        <!--<el-table-column type="selection" width="55" align="center" />-->
        <!-- <el-table-column label="消息类型" align="left" prop="messType" /> -->
        <el-table-column label="名称" align="left" prop="name" />
        <el-table-column label="编号" align="left" prop="code" />
        <el-table-column label="实验室危险源占比" align="left" prop="labScale">
          <template slot-scope="scope">
            <div class="progress-box">
            <el-progress :text-inside="true" :stroke-width="20" color="#52a1fe" :percentage="scope.row.labScale" style="margin-right:74px;"></el-progress>
            </div>
          </template>
        </el-table-column>
        <el-table-column label="查看次数" align="left" prop="scanCount" width="100" />
        <el-table-column label="二维码" align="left" width="100">
          <template slot-scope="scope">
            <div @click="dialogQrCodeOn(scope.row.qrCodeUrl)">
              <vue-qr style="height:23px;width:23px;cursor:pointer;" :text="scope.row.qrCodeUrl" :size="200"></vue-qr>
            </div>
          </template>
        </el-table-column>
        <el-table-column label="操作" align="left" class-name="small-padding fixed-width" width="160" v-if="tableButtonType">
          <template slot-scope="scope">
            <div class="button-box">
              <p class="table-min-button"
                 @click="addLaboratoryButton(scope.row)"
                 v-hasPermiAnd="['laboratory:hazard:query','laboratory:hazard:edit']"
              >编辑</p>
              <p class="table-min-button"
                 @click="handleDelete(scope.row)"
                 v-hasPermi="['laboratory:hazard:remove']"
              >删除</p>
            </div>
          </template>
        </el-table-column>
      </el-table>

      <pagination :page-sizes="[20, 30, 40, 50]"
        v-show="total>0"
        :total="total"
        layout="total, prev, pager, next, sizes, jumper"
        :page.sync="queryParams.pageNum"
        :limit.sync="queryParams.pageSize"
        @pagination="getList"
      />
    </div>
    <add-laboratory v-if="pageType==2" :hazardId="hazardId"></add-laboratory>
    <!-- 二维码展示 -->
    <el-dialog title="二维码" class="qr-codeUrl-dialog" :visible.sync="dialogQrCodeType" width="300px" append-to-body>
      <vue-qr style="display: block;height:200px;width:200px;cursor:pointer;margin:0 auto;" :text="dialogQrCodeUrl" :size="200"></vue-qr>
    </el-dialog>
  </div>
</template>

<script>
  import { listHazard, getHazard, delHazard, addHazard, updateHazard } from "@/api/laboratory/hazard";
  import addLaboratory from "./addLaboratory.vue";
  import { done } from 'element-ui'
  import vueQr from 'vue-qr'
export default {
  components: {
    addLaboratory,
    vueQr
  },
  name: "Hazard",
  data() {
    return {
      tableButtonType:this.hasPermiDom(['laboratory:hazard:query','laboratory:hazard:edit','laboratory:hazard:remove']),
      // 遮罩层
      loading: true,
      // 选中数组
      ids: [],
      // 子表选中数据
      checkedLabHazardSubjectRelation: [],
      // 非单个禁用
      single: true,
      // 非多个禁用
      multiple: true,
      // 显示搜索条件
      showSearch: true,
      // 总条数
      total: 0,
      // 危险源表格数据
      hazardList: [],
      // 危险源和实验室关联表格数据
      labHazardSubjectRelationList: [],
      // 弹出层标题
      title: "",
      // 是否显示弹出层
      open: false,
      // 查询参数
      queryParams: {
        pageNum: 1,
        pageSize:20,
        chName: null,
        enName: null,
        casNo: null,
        dangerCode: null,
        flammability: null,
        ignitionPoint: null,
        combustionProducts: null,
        stability: null,
        taboo: null,
        skinContactAid: null,
        eyeContactAid: null,
        inhalationAid: null,
        ingestionAid: null,
        engineeringProtection: null,
        personalProtection: null,
        storage: null,
        leakageTreatment: null,
        deptId: null,
        deptName: null,
        userId: null,
      },
      // 表单参数
      form: {},
      // 表单校验
      rules: {
      },
      //新增危险源
      pageType:1,
      hazardId: null,
      //二维码展示数据
      dialogQrCodeType:false,
      dialogQrCodeUrl:"",
    };
  },
  created() {
    this.getList();
  },
  methods: {
    dialogQrCodeOn(url){
      this.dialogQrCodeUrl = url;
      this.dialogQrCodeType = true;
    },
    //新建危险源
    addLaboratoryButton(row){
      console.log(row.hazardId)
      this.hazardId = row.hazardId
      this.pageType = 2;
    },
    offLaboratoryButton(){
      this.pageType = 1;
    },
    /** 查询危险源列表 */
    getList() {
      this.loading = true;
      listHazard(this.queryParams).then(response => {
        this.hazardList = response.rows;
        this.total = response.total;
        this.loading = false;
      });
    },
    // 取消按钮
    cancel() {
      this.open = false;
      this.reset();
    },
    clickPageTypeOne(){
      this.pageType = 1;
      this.getList();
    },
    // 表单重置
    reset() {
      this.form = {
        id: null,
        chName: null,
        enName: null,
        casNo: null,
        dangerCode: null,
        flammability: null,
        ignitionPoint: null,
        combustionProducts: null,
        stability: null,
        taboo: null,
        skinContactAid: null,
        eyeContactAid: null,
        inhalationAid: null,
        ingestionAid: null,
        engineeringProtection: null,
        personalProtection: null,
        storage: null,
        leakageTreatment: null,
        deptId: null,
        deptName: null,
        createTime: null,
        userId: null,
        createBy: null,
        updateTime: null,
        updateBy: null,
        remark: null
      };
      this.labHazardSubjectRelationList = [];
      this.resetForm("form");
    },
    /** 搜索按钮操作 */
    handleQuery() {
      this.queryParams.pageNum = 1;
      this.getList();
    },
    /** 重置按钮操作 */
    resetQuery() {
      // this.resetForm("queryForm");
      this.$set(this,'queryParams',{
        pageNum: 1,
        pageSize:20,
        name:"",
      });
      this.handleQuery();
    },
    // 多选框选中数据
    handleSelectionChange(selection) {
      this.ids = selection.map(item => item.hazardId)
      this.single = selection.length!==1
      this.multiple = !selection.length
    },
    /** 新增按钮操作 */
    handleAdd() {
      this.reset();
      this.open = true;
      this.title = "添加危险源";
    },

    /** 删除按钮操作 */
    handleDelete(row) {
      const ids = row.hazardId || this.ids;
      this.$confirm('是否确认删除危险源?', "警告", {
          confirmButtonText: "确定",
          cancelButtonText: "取消",
          type: "warning"
        }).then(function() {
          return delHazard(ids);
        }).then(() => {
          this.getList();
          this.msgSuccess("删除成功");
        }).catch(() => {});
    },
    /** 导出按钮操作 */
    handleExport() {
      this.download('laboratory/hazard/export', {
        ...this.queryParams
      }, `laboratory_hazard.xlsx`)
    },
  }
};
</script>

<style scoped lang="scss">
  .hazard {
    display: flex!important;
    flex-direction: column;
    box-shadow: 0 0 8px 2px rgba(0, 0, 0, 0.1);
    /*padding:11px 20px 20px!important;*/
    .hazard-min{
      flex:1;
      overflow: hidden;
      display: flex!important;
      flex-direction: column;
      padding:11px 20px 20px!important;
    }
    .form-box{
      margin-top:12px;
      //display: flex;
      .null-p{
        flex:1;
      }
    }
    .button-box{
      display: flex;
      height:30px;
      width:190px;
      /*margin-top:40px;*/
      /*margin-right:40px;*/
      margin:0 auto;
    }
  }
</style>
